%------------------------------------------------

\begin{frame}{Results}
	\tiny
    \begin{columns}[c] % The "c" option specifies centered vertical alignment while the "t" option is used for top vertical alignment

       \column{.5\textwidth}
	\input{tables/reg.tex}\footnote{Year/Month fixed effects omited}\footnote{All reported values are logged}\footnote{Single stage preliminary results do not cite}
        \column{.45\textwidth} % Left column and width
        \textbf{Heading}
        \begin{enumerate}
            \item Statement
            \item Explanation
            \item Example
        \end{enumerate}


\end{columns}
\end{frame}
